zh-cn	防疫消毒须知（第四部分） 
en-us	Tips on disinfection (Part 4) 

zh-cn	在家里安装紫外线灯用作空气消毒是有害的 
en-us	Using UV light to disinfect the air at home is harmful. 

zh-cn	紫外线照射过量有致盲和皮肤致癌的风险，这样做不仅达不到消毒目的，还会对人体造成伤害。 
en-us	Excessive UV rays will not serve the purpose of disinfection but are proved to be harmful to the human body as they can seriously damage the eyes and lead to skin cancer. 

zh-cn	使用化学消毒剂时应该注意什么？ 
en-us	What to watch out for when using chemical disinfectants? 

zh-cn	用化学消毒剂来进行空气消毒时，要确保没有人。
en-us	You must make sure no human being is in the area when disinfecting the air with chemical agents. 

zh-cn	往人体大量喷洒消毒剂，包括强迫通过消毒通道，可能使消毒剂经过呼吸吸入，可能会对人体造成伤害。 
en-us	Spraying large amounts of disinfectants to people directly like making people go through a disinfection tunnel is not recommended as the chemicals inhaled may cause damage to the body. 

zh-cn	保持健康的生活方式更重要 
en-us	Leading a healthy way of life is more important. 

zh-cn	过度消毒不仅会杀灭有害的病原微生物，也会杀灭部分有益的微生物，可能损害人体健康。 
en-us	Unnecessary disinfection may undermine a person’s health as it kills even beneficial microorganisms. 

zh-cn	日常条件下，在正常的生活环境中，我们做到保持清洁卫生即可，不必过度消毒。
en-us	In everyday life, keeping clean and maintaining good hygiene is enough.