zh-cn	一次性医用口罩可以消毒和重复使用吗？不可以。
en-us	Can disposable medical face masks be sterilized and reused?No. 

zh-cn	一次性医用口罩只能一次性使用。
en-us	Disposable medical face masks are intended for a single use only. 

zh-cn	用后，应妥善取下口罩（不触摸正面，从后面通过两端皮筋或线绳取下口罩），并立即丢入带盖的传染性材料垃圾桶，然后采取手卫生措施。
en-us	After use masks should be removed  with appropriate techniques (i.e. do no touch the front, remove by pulling the elastic ear straps or laces from behind) and disposed of immediately in an infectious waste bin with a lid, followed by hand hygiene.