en-us	One runner didn't let the French government's order to remain indoors prevent him from training for a marathon amid the coronavirus pandemic. 
zh-cn	在新冠肺炎疫情期间，一名法国跑步爱好者没有因为法国政府的居家命令而停止马拉松训练。

en-us	Last week, Elisha Nochomovitz, a 32-year-old furloughed restaurant worker, ran the length of a marathon — on his 23-foot long balcony. 
zh-cn	上周，暂时休假在家的32岁餐厅员工以利沙·诺科莫维茨在家中23英尺长(约合7米)的阳台上跑完了全程马拉松(42.195公里)。

en-us	And he did it in six hours and 48 minutes, a personal record nearly double that of his previous finish time. 
zh-cn	他用6小时48分钟的时间完成了这次"阳台马拉松"，是他之前全程马拉松个人记录时长的近两倍。

en-us	Although Nochomovitz has run 36 marathons, he said his balcony marathon was the most challenging. 
zh-cn	尽管诺科莫维茨已经跑了36次马拉松，他说这次"阳台马拉松"最具挑战性。

en-us	Due to the short length of the balcony, Nochomovitz was unable to gain any momentum or speed as he had to constantly turn back and forth.
zh-cn	由于阳台很短，诺科莫维茨无法增加动力或加快速度，因为他必须不断地来回转圈。

en-us	He said he ran about 3,000 laps.
zh-cn	他说他跑了大约3000圈。