en-us	The heir to the British throne, Prince Charles, on Wednesday became the most prominent public figure in the UK to be confirmed as having coronavirus, in a development that raises questions about the risk the virus poses to senior royals.
zh-cn	英国王储查尔斯王子25日成为英国被确诊感染新型冠状病毒的最知名公众人物，这一事态发展引发了有关新冠病毒对王室高级成员构成风险的疑问。

en-us	"He has been displaying mild symptoms but otherwise remains in good health and has been working from home throughout the last few days as usual," Clarence House said.
zh-cn	克拉伦斯宫表示："他有轻微症状，但除此之外健康状况良好，过去几天照常在家工作"。

en-us	The prince's wife, the Duchess of Cornwall, had also been tested but did not have the virus.
zh-cn	查尔斯王子的妻子康沃尔公爵夫人也接受了新冠病毒检测，结果呈阴性。

en-us	It is not possible to ascertain from whom the prince caught the virus owing to the high number of engagements he carried out in his public role during recent weeks.
zh-cn	无法确定查尔斯王子是从谁那里感染的病毒，因为最近几周他出席了许多的公务活动。

en-us	The prince's illness raises questions about the potential risk from the virus to his mother, the Queen, who is 93, and the Duke of Edinburgh, her husband, who is 98.
zh-cn	查尔斯王子感染新冠病毒，令外界对病毒可能给他的母亲、93岁的女王及其98岁的丈夫爱丁堡公爵带来的潜在风险产生疑问。

en-us	However, Buckingham Palace, the queen's official residence, said the monarch remained in good health.
zh-cn	但女王的官邸白金汉宫表示，女王身体状况良好。