en-us	German Chancellor Angela Merkel has made the decision to self-quarantine in her home after having contact with a doctor who tested positive for the novel coronavirus.
zh-cn	由于日前接触过的一名医生新冠病毒检测呈阳性，默克尔已决定开始居家隔离。

en-us	Merkel will be tested regularly over the coming days and will continue to conduct her duties as chancellor from home.
zh-cn	默克尔在未来几天里将接受多次检测，居家隔离期间她仍将继续处理公务。

en-us	Earlier Sunday, Merkel announced Germany was banning meetings of more than two people in public for the next two weeks to contain the virus.
zh-cn	当日早些时候，默克尔宣布，为了遏制新冠疫情，未来两周该国禁止两人以上的公开聚集活动。

en-us	Exceptions to the rules are being made for people who live together and for work-related gatherings.
zh-cn	不过共同居住以及与工作相关的聚会将获得豁免。