en-us	Trump says he could see recommending all Americans wear masks 
zh-cn	特朗普表示，他可以建议所有美国人都戴口罩。 

en-us	(CNN)President Donald Trump said Monday he could foresee a scenario where all Americans are recommended to wear masks in public to prevent the spread of coronavirus. 
zh-cn	国有线电视新闻网(CNN)总统唐纳德特朗普(Donald Trump)周-示,他可以预见到一种情况，即建议所有美 国人在公共场合戴口罩，以防止冠狀病毒的传播。 

en-us	The idea, which was raised in a road map on combating coronavirus authored by his former Food and Drug Administration head, Dr. Scott Gottlieb, runs counter to the current government directive that masks aren't necessary for most people. 
zh-cn	这一想法是在他的前食品和药物管理局(Food And Drug Administration)局长斯科特戈特利布(Scott Gottieb)博士撰写的抗罐状病毒路线图中提出的，与目前政府关于大多数人不需要口罩的指令背道而驰。 

en-us	Trump said that could potentially change, but only for a short period. 
zh-cn	特朗普表示，这种情况可能会改变,职会持续很短的一段时间。 

en-us	Meadows resigns from Congress to officially start work as Trump's chief of staff 
zh-cn	梅多斯从国会辞职，式开始担任特朗普的幕僚长。 总统在每日新闻发布会上说:

en-us	"I saw his suggestion on that. We will take a look at it," the President said during his daily news briefing, saying he hadn't discussed the idea yet with his task force. 
zh-cn	“我看到了他在这方面的建议。我们会考虑的。”他说，他还没有与他的特别工作组讨论过这个想法。 

en-us	A source close to the coronavirus task force said the idea of asking Americans to wear masks for a period of time during the pandemic is likely to be under "serious discussion." 
zh-cn	-位接近冠状病毒特别工作组的消息人士称,要求美国人在大流行期间戴口罩一段时间的想法可能正在“认真讨论” 

en-us	The source said part of the issue with the recommendation is the current supply of masks would not meet the ongoing demand.
zh-cn	这位消息人士说，这项建议的部分问题是，目前的口罩供应不能满足正在进行的需求。

en-us	Then, of course, there is the issue of medical professionals who still lack critical personal protective equipment due to supply shortages. 
zh-cn	当然，还有医疗专业人员的 问题，由于供应短缺，他们仍然缺乏关键的个人防护设备。 

en-us	"You don't want to create a shortage for health care workers," the source said. 
zh-cn	该消息人士称,“你不想造成医护人员短缺.” 

en-us	Trump said that if he does offer that recommendation, it would be for "a period of time, not forever." 
zh-cn	特朗普表示，如果他真的提出了这一建议，那将是“一段时间，而不是永远”。 

en-us	"We want our country back," the President said during the Rose Garden briefing. 
zh-cn	“我们想要回我们的国家，”总统在玫瑰园简报会上说。

en-us	"We are not going to be wearing masks forever, but it could be for a short period of time after we get back into gear. 
zh-cn	“我们不会永远戴口罩,何能会在我们恢复正常后的一段短时间内。

en-us	I could see something like that happening for a period of time." 
zh-cn	我可以看到这样的事情会在-段时间内发生。 ” 

en-us	"I would hope it would be a very limited period of time," he said. 
zh-cn	“我希望这是一段非常有限的时间，”他说。 