zh-cn	出院 
en-us	Discharge 

zh-cn	出院标准 
en-us	Discharge criteria 

zh-cn	体温恢复正常3天以上 
en-us	Body temperature back to normal for more than 3 days 

zh-cn	呼吸道症状明显好转 
en-us	Respiratory symptoms improve clearly 

zh-cn	肺部影像学显示急性渗出性病变明显改善 
en-us	Pulmonary imaging shows obvious absorption of inflammation 

zh-cn	连续两次痰、鼻咽拭子等呼吸道标本核酸检测阴性（采样时间至少间隔24小时）
en-us	Nucleic acid tests negative twice consecutively on respiratory tract samples, such as sputum and nasopharyngeal swabs (sampling interval of at least 24 hours) 

zh-cn	出院后注意事项
en-us	After-discharge considerations 

zh-cn	继续14天隔离 
en-us	Monitor health status in isolation for 14 days 

zh-cn	佩戴口罩 
en-us	Wear a mask 

zh-cn	有条件的居住在通风良好的单人房间 
en-us	Live in well-ventilated single room if possible 

zh-cn	减少与家人近距离密切接触 
en-us	Minimize close contact with family members 

zh-cn	分餐饮食 
en-us	Separate dinning 

zh-cn	做好手部卫生 
en-us	Practice hand hygiene 

zh-cn	避免外出活动 
en-us	Avoid going out 

zh-cn	出院后第2周和第4周到医院复诊
en-us	Return to hospital for follow-up and re-visit 2 and 4 weeks after discharge