zh-cn	病原学和流行病学特点 
en-us	Etiological & Epidemiological Characteristics 

zh-cn	病原学特点 
en-us	Etiological characteristics 

zh-cn	病毒对紫外线和热敏感 
en-us	The virus is sensitive to ultraviolet light and heat 

zh-cn	以下方法可有效灭活病毒 
en-us	The following can effectively inactivate the virus 

zh-cn	56°C30分钟 
en-us	Exposure to 56°C for 30' 

zh-cn	乙醚 
en-us	Ether 

zh-cn	75%乙醇 
en-us	75% Ethanol 

zh-cn	含氯消毒剂 
en-us	Chlorine-containing disinfectant 

zh-cn	过氧乙酸 
en-us	Peracetic acid 

zh-cn	氯仿 
en-us	Chloroform 

zh-cn	流行病学特点 
en-us	Epidemiological Characteristics 

zh-cn	传染源 
en-us	Sources of infection 

zh-cn	主要传染源：新型冠状病毒感染的患者 
en-us	Major source: Patients infected by the novel coronavirus 

zh-cn	可能传染源：无症状感染者 
en-us	Possible source: Asymptomatic infected people 

zh-cn	传播途径 
en-us	Routes of transmission 

zh-cn	呼吸道飞沫 
en-us	Respiratory droplets 

zh-cn	密切接触 
en-us	Close contact 

zh-cn	在相对封闭的环境中长时间暴露于高浓度气溶胶情况下存在经气溶胶传播的可能 
en-us	There is the possibility of aerosol transmission in a relatively closed environment for a long-time exposure to high concentrations of aerosol. 

zh-cn	由于在粪便及尿中可分离到新型冠状病毒，应注意粪便及尿对环境污染造成气溶胶或接触传播 
en-us	As the novel coronavirus can be isolated in feces and urine, attention should be paid to feces or urine-contaminated environments that may lead to aerosol or contact transmission. 

zh-cn	易感人群 
en-us	Susceptible groups 

zh-cn	人群普遍易感
en-us	People are generally susceptible